LIBRARY usbcamd.sys
EXPORTS
DllUnload@0
USBCAMD_AdapterReceivePacket@16
USBCAMD_ControlVendorCommand@36
;USBCAMD_Debug_LogEntry
USBCAMD_DriverEntry@20
USBCAMD_GetRegistryKeyValue@20
USBCAMD_InitializeNewInterface@16
USBCAMD_SelectAlternateInterface@8
